bias

y (μm) bias variation

bias

y (μm) bias variation

bias

y (μm) bias variation

bias

y (μm) bias variation

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

0 1000 2000 3000

-1.5

-1

-0.5

0

0.5

0 1000 2000 3000

-6 -5.75

-5.5

-5.25 -5 -4.75

-4.5

-4.25 -4

0 1000 2000 3000 -5 -2.5 0 2.5 5 7.5 10 12.5 15

0 1000 2000 3000