1820

1825

1830

1835

1840

1845

1850

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-48000

-46000

-44000

-42000

-40000

-38000

-36000

-34000

-32000

-20000 -15000 -10000 -5000 0

-48000

-46000

-44000

-42000

-40000

-38000

-36000

-34000

-32000

-20000 -15000 -10000 -5000 0

1820

1825

1830

1835

1840

1845

1850

-20000 -15000 -10000 -5000 0

1820

1825

1830

1835

1840

1845

1850

-45000 -40000 -35000