1820

1825

1830

1835

1840

1845

1850

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-43000

-42750

-42500

-42250

-42000

-41750

-41500

-41250

-41000

-19540 -19520 -19500 -19480 -19460

-43000

-42750

-42500

-42250

-42000

-41750

-41500

-41250

-41000

-19540 -19520 -19500 -19480 -19460

1820

1825

1830

1835

1840

1845

1850

-19540 -19520 -19500 -19480 -19460

1820

1825

1830

1835

1840

1845

1850

-43000 -42500 -42000 -41500 -41000