1820

1825

1830

1835

1840

1845

1850

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-32000

-31000

-30000

-29000

-28000

-27000

-20500 -20000 -19500 -19000 -18500

-32000

-31000

-30000

-29000

-28000

-27000

-20500 -20000 -19500 -19000 -18500

1820

1825

1830

1835

1840

1845

1850

-20500 -20000 -19500 -19000 -18500

1820

1825

1830

1835

1840

1845

1850

-32000 -30000 -28000