1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-30680

-30660

-30640

-30620

-30600

-30580

-30560

-30540

-30520

-30500

-22310 -22305 -22300 -22295 -22290

-30680

-30660

-30640

-30620

-30600

-30580

-30560

-30540

-30520

-30500

-22310 -22305 -22300 -22295 -22290

1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

-22310 -22305 -22300 -22295 -22290

1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

-30650 -30600 -30550 -30500