1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

bias

x (steps) y (steps)

bias

x (steps) y (steps)

bias projected onto x bias projected onto y

-34400

-34200

-34000

-33800

-33600

-33400

-33200

-33000

-32800

-32600

-23040 -23020 -23000 -22980 -22960

-34400

-34200

-34000

-33800

-33600

-33400

-33200

-33000

-32800

-32600

-23040 -23020 -23000 -22980 -22960

1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

-23040 -23020 -23000 -22980 -22960

1820

1822.5

1825

1827.5

1830

1832.5

1835

1837.5

1840

1842.5

1845

-34000 -33500 -33000 -32500