1821.75

1822

1822.25

1822.5

1822.75

1823

1823.25

1823.5

1823.75

bias

x (steps) y (steps)

29000

30000

31000

32000

33000

34000

35000

2500 5000 7500 10000 12500 15000 17500 20000 22500