1827

1827.5

1828

1828.5

1829

1829.5

1830

bias

x (steps) y (steps)

10000

15000

20000

25000

30000

35000

40000

45000

50000

10000 12000 14000 16000 18000 20000 22000 24000 26000 28000 30000