bias

y (μm) bias variation

bias

x (μm) bias variation

bias

y (μm) bias variation

bias

x (μm) bias variation

-0.6

-0.4

-0.2

0

0.2

0.4

0 20 40

-0.3

-0.28

-0.26

-0.24

-0.22

-0.2

-0.18

-0.16

-0.14

0 20 40

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0 20 40

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0 20 40