cos θ separation (σ) focusing i-TOP (2) focusing i-TOP (1)

1-readout f-TOP

2-readout f-TOP p=2GeV/c

cos θ p=3GeV/c

cos θ p=4GeV/c 4x4 m-alkali 50ps 0μm 0 2 4 6 8

-0.5 0 0.5 0 2 4 6 8

-0.5 0 0.5 0 2 4 6 8

-0.5 0 0.5