momentum (Gev/c)

N_0 (1/cm)

n=1.05 Fine n=1.029 Fine n=1.05 Coarse n=1.029 Coarse 0

10

20

30

40

50

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5