0 100 200 300 400 500 600 700 800 900

0 0.2 0.4 0.6

θ (rad)

Entries

(a) Cherenkov angle

<θ> = 0.322 rad σ_θ = 14.8 mrad

0 50 100 150 200 250 300 350 400

0 10 20

(b) Number of hits

<N_{pe} > = 6.2

N

Entries